Type-Designer Installation

With the Type-Designer installation program you install Type-Designer on your harddisk. This way, all necessary files are copied to the appropriate subdirectories.

You only have to define the following directories:

Type-Designer Directory

Enter here the directory where you would like to install Type-Designer.

The default setting is C:\TD.

Type 1 Directory

Enter here the directory where you normally store your Type 1 Fonts.

The default setting is C:\PSFONTS.

Serial No.

The Serial Number can be found on the Installation Disk. Without entering the correct number it is impossible to install Type-Designer!

Errors

If an error occurs during installation, an error message will appear and the installation program will be aborted.

Start the Install program again after you have corrected the error.

Group into Program Manager

The Install program automatically creates a group in Program Manager for Type-Designer.

Simply click on the TD icon to start Type-Designer:

Problems

On some Windows Systems there might be a problem during creation of the Type-Designer group.

You can then manually press the Alt-Tab key-combination to switch to Program-Manager and back to the Type-Designer Install program.

Normally the installatin then finishs correctly.